From a9a468bd18f56924affe51188a857c5595fc858d Mon Sep 17 00:00:00 2001
From: schneefux <schneefux+commit@schneefux.xyz>
Date: Fri, 20 Jul 2018 17:09:23 +0200
Subject: Fix Wrong pick/win rates being calculated in different places

---
 src/TopTalentsBox.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/TopTalentsBox.vue')

diff --git a/src/TopTalentsBox.vue b/src/TopTalentsBox.vue
index 88d5fb7..fdda6c3 100644
--- a/src/TopTalentsBox.vue
+++ b/src/TopTalentsBox.vue
@@ -18,8 +18,8 @@
           <span>{{ Math.round(100 * playersPerMatch * props.row.Count / totalPicks) }}%</span>
         </b-table-column>
 
-        <b-table-column field="Winner" label="Win Rate" sortable numeric>
-          <span>{{ Math.round(100 * props.row.Winner) }}%</span>
+        <b-table-column field="TotalWinner" label="Win Rate" sortable numeric>
+          <span>{{ Math.round(100 * props.row.TotalWinner) }}%</span>
         </b-table-column>
       </template>
     </b-table>
-- 
cgit v1.3.1

